√ s = 183 GeV √ s = 189 GeV √ s = 200 GeV

NEXTCALIBUR 26.483 ± 0.041 29.679 ± 0.047 35.893 ± 0.048

  PVALPHA 26.47 ± 0.04 29.70 ± 0.04 35.93 ± 0.05

  WPHACT 26.442 ± 0.009 29.667 ± 0.010 35.894 ± 0.012

Table 1: Cross-section for e+e� → e�νeμ+ν¯.

√ s = 183 GeV √ s = 189 GeV √ s = 200 GeV

NEXTCALIBUR 37.956 ± 0.052 42.088 ± 0.064 49.842 ± 0.065

  WPHACT 38.128 ± 0.015 42.256 ± 0.016 50.070 ± 0.020

Table 2: Cross-section for e+e� → e�νee+νe.